SCHEDULE

Location of the regulated works
(introduced by section 1)
1
The centre point of each of the turbines is to be at the following reference points—
Turbine No. | Easting (m) | Northing (m)
A1 | 290703 | 543168
A2 | 291153 | 542982
B1 | 290130 | 542923
B2 | 290524 | 542739
B3 | 290962 | 542541
B4 | 291367 | 542368
B5 | 291753 | 542132
C1 | 289517 | 542725
C2 | 289955 | 542530
C3 | 290352 | 542343
C4 | 290789 | 542134
C5 | 291181 | 541954
C6 | 291592 | 541751
D1 | 288897 | 542509
D2 | 289324 | 542311
D3 | 289777 | 542101
D4 | 290174 | 541915
D5 | 290602 | 541720
D6 | 290996 | 541539
D7 | 291424 | 541341
E1 | 288346 | 542239
E2 | 288711 | 542068
E3 | 289150 | 541873
E4 | 289583 | 541672
E5 | 289989 | 541489
E6 | 290416 | 541299
E7 | 290826 | 541088
E8 | 291237 | 540902
F1 | 288118 | 541830
F2 | 288560 | 541691
F3 | 288985 | 541449
F4 | 289405 | 541259
F5 | 289810 | 541075
F6 | 290246 | 540875
F7 | 290649 | 540678
F8 | 291067 | 540490
G1 | 287916 | 541413
G2 | 288343 | 541214
G3 | 288806 | 541024
G4 | 289227 | 540846
G5 | 289628 | 540661
G6 | 290060 | 540474
G7 | 290471 | 540285
G8 | 290901 | 540099
H1 | 288175 | 540806
H2 | 288621 | 540590
H3 | 289032 | 540418
H4 | 289453 | 540247
H5 | 289874 | 540061
H6 | 290303 | 539874
H7 | 290733 | 539706
J1 | 288425 | 540126
J2 | 288846 | 539948
J3 | 289267 | 539786
J4 | 289688 | 539616
J5 | 290109 | 539438
J6 | 290505 | 539284
K1 | 288660 | 539527
K2 | 289089 | 539349
K3 | 289502 | 539171
2
The centre point of the electrical substation is to be at reference point Easting (m) 291150 and Northing (m) 540380 or at reference point Easting (m) 288514 Northing (m) 539284.
3
The centre point of the anemometry mast is to be at reference point Easting (m) 288514 Northing (m) 539284 and the connecting power and communication cables are to run from that point and to join the system at turbine No. K1.
4
The routes of the cables referred to in section 1(1)(d) of this Act are to run in direct lines between any two adjacent turbines and between the electrical substation and—
a
turbines Nos. G8 and F8; or
b
turbine No. K1.
5
The route of the cables referred to in section 1(1)(e) of this Act is to commence by a connection with the electricity substation and to run in a south easterly direction until it reaches the boundary of Scotland at reference point Easting (m) 291510 Northing (m) 540140 or is to follow such alternative route as may be permitted by the Scottish Ministers under section 34 of the Coast Protection Act 1949 (c. 74).