Part 7

Compulsory treatment orders
Chapter 4

Review of orders

Recorded matters: reference to Tribunal by responsible medical officer

Reference to Tribunal under section 96(3): notification
97
Where a patient’s responsible medical officer is required by section 96(3) of this Act to make a reference to the Tribunal, the responsible medical officer shall, as soon as practicable after the duty to make the reference arises, give notice that the reference is to be made to the persons mentioned in section 91(a) to (f) of this Act.
S. 97 in force at 5.10.2005 by S.S.I. 2005/161, art. 3 (as substituted (1.7.2005) by S.S.I. 2005/375, art. 2 and as amended (22.9.2005) by S.S.I. 2005/459, art. 2)