Part 7

Compulsory treatment orders
Chapter 2

Interim compulsory treatment orders: review and revocation

Revocation under section 72 or 73: notification
74
1
Where a patient’s responsible medical officer makes a determination under section 72 of this Act, the responsible medical officer shall, as soon as practicable after doing so—
a
give notice of the determination; and
b
send a statement of the reasons for it,
to the Commission and to the persons mentioned in subsection (3) below.
2
Where the Commission makes a determination under section 73 of this Act, it shall, as soon as practicable after doing so—
a
give notice of the determination; and
b
send a statement of the reasons for it,
to the patient’s responsible medical officer and to the persons mentioned in subsection (3) below.
3
The persons referred to in subsections (1) and (2) above are—
a
the patient;
b
the patient’s named person;
c
any guardian of the patient;
d
any welfare attorney of the patient;
e
the mental health officer; and
f
the Tribunal.
S. 74 in force at 5.10.2005 by S.S.I. 2005/161, art. 3 (as substituted (1.7.2005) by S.S.I. 2005/375, art. 2 and as amended (22.9.2005) by S.S.I. 2005/459, art. 2)