Part 17

Patient representation etc.
Chapter 3

Detention in conditions of excessive security

Interpretation of Chapter

Interpretation of Chapter
273
In this Chapter—
- “relevant Health Board” means, in relation to a patient of such description as may be specified in regulations, the Health Board, or Special Health Board—
  1. of such description as may be so specified; or
  2. determined under such regulations; and
- “relevant patient” means—
  1. in sections 264 to 267 of this Act—
    1. a patient whose detention in hospital is authorised by a compulsion order and who is also subject to a restriction order; or
    2. a patient whose detention in hospital is authorised by a hospital direction or a transfer for treatment direction;
  2. in sections 268 to 271 of this Act—
    1. a qualifying patient whose detention in hospital is authorised by a compulsion order and who is also subject to a restriction order; or
    2. a qualifying patient whose detention in hospital is authorised by a hospital direction or a transfer for treatment direction.