Part 9

Compulsion orders
Chapter 2

Review of compulsion orders

Powers of Tribunal

Limit on power of Tribunal to make interim order
170
The Tribunal may not make an interim order under section 168 or 169 of this Act if the effect of making the order would be that interim orders under either, or both, of those sections would be in force for a continuous period of more than 56 days.
S. 170 in force at 5.10.2005 by S.S.I. 2005/161, art. 3 (as substituted (1.7.2005) by S.S.I. 2005/375, art. 2 and as amended (22.9.2005) by S.S.I. 2005/459, art. 2)