Part 9

Compulsion orders
Chapter 2

Review of compulsion orders

Extension of order following further review

Further review: responsible medical officer’s duty to extend compulsion order
152
1
This section applies where a patient’s responsible medical officer is carrying out a further review of the relevant compulsion order to which the patient is subject.
2
If, having regard to—
a
any views expressed by persons consulted under section 139(3)(c) of this Act for the purpose of the review being carried out; and
b
any views expressed by the mental health officer under section 151(2)(d) of this Act for the purpose of that review,
the responsible medical officer is satisfied as to the matters mentioned in section 150(2)(a) and (b) of this Act, the responsible medical officer shall make a determination extending the compulsion order for the period mentioned in subsection (3) below.
3
The period referred to in subsection (2) above is—
a
where a determination is made in respect of the first further review, the period of 12 months beginning with the expiry of the period for which the order is extended by virtue of an order under section 167 of this Act;
b
where a determination is made in respect of a subsequent further review, the period of 12 months beginning with the expiry of the period of 12 months for which the order is extended as a result of the immediately preceding further review.
S. 152 in force at 5.10.2005 by S.S.I. 2005/161, art. 3 (as substituted (1.7.2005) by S.S.I. 2005/375, art. 2 and as amended (22.9.2005) by S.S.I. 2005/459, art. 2)