Part 9

Compulsion orders
Chapter 2

Review of compulsion orders

Revocation of order by responsible medical officer or Commission

Revocation of compulsion order: notification
144
1
Where a patient’s responsible medical officer makes a determination under section 141 or 142 of this Act, the responsible medical officer shall—
a
give notice of the determination; and
b
send a statement of the reasons for it,
to the Commission and to the persons mentioned in subsection (3) below.
2
Where the Commission makes a determination under section 143 of this Act it shall—
a
give notice of the determination; and
b
send a statement of the reasons for it,
to the patient’s responsible medical officer and to the persons mentioned in subsection (3) below.
3
The persons referred to in subsections (1) and (2) above are—
a
the patient;
b
the patient’s named person;
c
any guardian of the patient;
d
any welfare attorney of the patient;
e
the mental health officer; and
f
the Tribunal.
4
Notice under subsection (1) or (2) above—
a
to the persons mentioned in subsection (3)(a) to (d) above shall be given as soon as practicable after the determination is made and, in any event, before the expiry of the period of 7 days beginning with the day on which the determination is made; and
b
to—
i
the Commission;
ii
the patient’s responsible medical officer; and
iii
the persons mentioned in subsection (3)(e) and (f) above,
shall be given before the expiry of the period of 7 days beginning with the day on which the determination is made.