SCHEDULE 3

Powers Of Entry And Inspection
4
The warrant must be executed at a reasonable hour, unless it appears to the person executing it that there are grounds for suspecting that the evidence in question would not be found if it were so executed.
Sch. 3 applied (with modifications) (1.1.2005) by The Environmental Information (Scotland) Regulations 2004 (S.S.I. 2004/520), reg 17(1)(2) (with reg. 3)