SCHEDULE 1

Scottish Public Authorities
Part 4

The National Health Service
46. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Sch. 1 Pt. 4: para. relating to the Scottish Medical Practices Committee repealed (1.4.2004) by Public Appointments and Public Bodies etc. (Scotland) Act 2003 (asp. 4), ss. 17, 21(2), Sch. 4 para. 17(a)(ii); S.S.I. 2004/148, art. 2(c)