SCHEDULE 4

SCOTTISH SECURE TENANCY: LANDLORD’S REPAIRING OBLIGATIONS
1
The landlord in a Scottish secure tenancy must—
a
ensure that the house is, at the commencement of the tenancy, wind and watertight and in all other respects reasonably fit for human habitation, and
b
keep the house in such condition throughout the tenancy.
Sch. 4 wholly in force at 30.9.2002, see s. 113(1)(2) and S.S.I. 2002/321, art. 2, Sch. (subject to transitional provisions and savings in arts. 3-5)