PART 2

ENFORCEMENT

... Commissioner's reports
14
1
Subject to section 10 above, it is for the Commissioner to decide whether to report to the Commission on the outcome of any investigation.
2
No report concluding that a councillor or a member of a devolved public body has contravened the councillors’ or, as the case may be, the members’ code shall be submitted to the Commission unless the councillor or member has been given a copy of the proposed report and an opportunity to make representations on the alleged contravention and on the proposed report.
3
At the same time as the Commissioner gives a copy of a proposed report to a councillor or a member of a devolved public body for the purposes of subsection (2) above, the Commissioner shall give a further copy to the council or, as the case may be, the devolved public body.
Words in s. 14 title substituted (1.4.2011) by Scottish Parliamentary Commissions and Commissioners etc. Act 2010 (asp 11), ss. 2(5), 31(5), sch. 1 para. 9 (with s. 31(6), sch. 7)
Words in s. 14(1)(3) substituted (1.4.2011) by Scottish Parliamentary Commissions and Commissioners etc. Act 2010 (asp 11), ss. 2(5), 31(5), sch. 1 para. 2 (with s. 31(6), sch. 7)
Words in s. 14(3) substituted (1.4.2011) by Scottish Parliamentary Commissions and Commissioners etc. Act 2010 (asp 11), ss. 2(5), 31(5), sch. 1 para. 4 (with s. 31(6), sch. 7)
Words in s. 14 heading omitted (1.7.2013) by virtue of The Public Services Reform (Commissioner for Ethical Standards in Public Life in Scotland etc.) Order 2013 (S.S.I. 2013/197), art. 1, sch. 2 para. 5 (with sch. 4 para. 3)