PART 2

REGISTER OF VISITOR ACCOMMODATION PROVIDERS

Changing the register

Power to change the register where no notice has been given to WRA
11
1
WRA may change a VAP’s entry in the register where no notice has been given by the VAP under section 9 if WRA considers that the entry is inaccurate.
2
Before WRA may change a VAP’s entry under subsection (1), WRA must issue a notice to that VAP—
a
specifying the information WRA considers inaccurate,
b
setting out whether WRA intends to—
i
omit that information, or
ii
make other changes to the entry, in which case WRA must specify the changes it intends to make,
c
informing the VAP that WRA will change the register on the date specified in the notice unless—
i
before that date, the VAP gives the notice required under section 9(1)(a) or (b), or
ii
WRA is satisfied that the register does not need to be changed, and
d
setting out information about rights of review and appeal.
3
The date specified in the notice under subsection (2)(c) must be at least 30 days after the day the notice is issued.
4
Where a VAP’s entry is changed under this section, the VAP remains liable to penalties under section 10; but the VAP is to be treated for the purposes of that section as having given the notice required by section 9(1)(a) or (b) from the time the VAP gives notice to WRA—
a
if the entry is inaccurate, providing the information necessary to make the VAP’s entry accurate, or
b
confirming that the entry is accurate.