PART 3 BUILDINGS OF SPECIAL ARCHITECTURAL OR HISTORIC INTEREST

CHAPTER 2 CONTROL OF WORKS AFFECTING LISTED BUILDINGS

Grant of listed building consent subject to conditions

98 Condition about period within which works must start
(1) Listed building consent must be granted subject to the condition that the works to which it relates must start before the end of a period which is specified in the condition and begins with the day the consent is granted.
(2) If consent is granted without the condition required by subsection (1), it is to be treated as having been granted subject to the condition that the works to which it relates must start within 5 years beginning with the day it was granted.
(3) This section does not apply to—
(a) consent under section 89(2) (consent for works already carried out);
(b) consent granted by a listed building partnership agreement (see section 113).

S. 98 not in force at Royal Assent, see s. 212(2)
S. 98 in force at 4.11.2024 by S.I. 2024/860, art. 3(b)