PART 3

BUILDINGS OF SPECIAL ARCHITECTURAL OR HISTORIC INTEREST
CHAPTER 1

LISTING BUILDINGS OF SPECIAL INTEREST

Temporary listing

End of temporary listing
85
1
Temporary listing of a building has effect until the end of the 6 months beginning with the day it takes effect under section 83(4), unless it ends under subsection (2) or (3).
2
If the Welsh Ministers serve notice under section 78(1) of a proposal to list the building, temporary listing ends when interim protection takes effect in relation to the building (and the building continues to be treated as if it were a listed building for certain purposes by virtue of section 79(2)).
3
If the Welsh Ministers notify the planning authority in writing that they do not intend to consult under section 78 on a proposal to list the building, temporary listing ends at the beginning of the day specified in the notification.
4
Schedule 7 makes provision about the effect of temporary listing coming to an end—
a
at the end of the 6-month period mentioned in subsection (1), or
b
because the Welsh Ministers give notification under subsection (3) that they do not intend to consult on a proposal to list the building.
5
If temporary listing ends in relation to a building because the Welsh Ministers notify the planning authority that they do not intend to consult on a proposal to list the building—
a
the authority must immediately give notice of that decision to every owner and occupier of the building;
b
the authority may not serve another temporary listing notice in respect of the building during the 12 months beginning with the day the Welsh Ministers give the notification.