PART 2

REGISTRATION AND REGULATION OF TERTIARY EDUCATION PROVIDERS
CHAPTER 2

QUALITY ASSURANCE AND IMPROVING QUALITY

Inspection of further education or training etc.

Annual plan of the Chief Inspector
67
1
The Chief Inspector must, for each financial year, prepare a plan setting out estimates of⁠—
a
the expenditure necessary, in the financial year to which the plan relates, in order to secure that the functions of the Chief Inspector are exercised effectively, and
b
the income which the Chief Inspector will receive in that financial year and which may be applied towards meeting the expenses of the Chief Inspector.
2
The plan must contain proposals for the management of any funds which may be provided to the Chief Inspector in that financial year under—
a
section 68 of this Act (funding by the Commission), and
b
section 104(4) of the Government of Wales Act 1998 (c. 38) (funding by the Welsh Ministers).
3
The plan must be submitted, for the purposes of consultation, to—
a
the Commission, and
b
the Welsh Ministers,
by such time before the beginning of the financial year to which it relates as they may jointly direct.
4
The Chief Inspector may publish the plan after it has been approved by—
a
the Commission, and
b
the Welsh Ministers.