PART 2

REGISTRATION AND REGULATION OF TERTIARY EDUCATION PROVIDERS
CHAPTER 2

QUALITY ASSURANCE AND IMPROVING QUALITY

Inspection of further education or training etc.

Action plans following inspections by the Chief Inspector
62
1
This section applies if the Chief Inspector publishes a report of an inspection.
2
But it does not apply to a report of an inspection conducted—
a
as a result of a request under section 58(2), or
b
under section 63.
3
The person responsible for the management of the provider of the education or training which is the subject of the report must prepare a written statement of the action which the person proposes to take in the light of the report and the period within which the person proposes to take it.
4
The person making the statement must publish it.
5
Subsection (6) applies if—
a
a person subject to the duties in subsections (3) and (4) is the governing body of a registered provider, and
b
the education or training which is the subject of the report relates to the provider’s category of registration.
6
Compliance with the duties in subsections (3) and (4) is to be treated as an ongoing registration condition that applies to the registered provider for the purposes of section 39 (directions in respect of failure to comply with ongoing registration conditions) and section 41 (de-registration).
7
Subsection (8) applies if the education or training which is the subject of the report is funded by the Commission or the Welsh Ministers under Part 3 of this Act.
8
Compliance with the duties in subsections (3) and (4) is to be treated as a requirement of the terms and conditions of funding under this Act.
S. 62 not in force at Royal Assent, see s. 148(2)