Parliaments shall have Continuance for seven Years, unless sooner dissolved by the King.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (15.9.2011) by Fixed-term Parliaments Act 2011 (c. 14), s. 7(2), Sch. para. 2 (with s. 6)