PART 7

ORDERS PROHIBITING WORK IN SOCIAL CARE: UNREGISTERED PERSONS

Interim prohibition orders: review
169
1
A fitness to practise panel must review an interim prohibition order as soon as practicable if—
a
the person in respect of whom the order is made requests a review, and
b
the request is made no earlier than 3 months after the date on which the order was made.
2
If an interim prohibition order is reviewed under subsection (1), a fitness to practise panel must review the order within each subsequent period of 3 months beginning with the date of the review under that subsection.
3
A fitness to practise panel may review an interim prohibition order at any time if new evidence becomes available which is relevant to the case.
4
Following a review, the panel may set aside an interim prohibition order.
S. 169 in force at 3.4.2017 by S.I. 2017/309, art. 2(f) (with arts. 3, 4, Sch.)