SCHEDULE 1

REGULATED SERVICES: DEFINITIONS

Interpretation
9
In this Schedule—
- “hospital” (“ysbyty”) means—
  1. a health service hospital within the meaning given by the National Health Service (Wales) Act 2006 (c.42),
  2. an independent hospital within the meaning given by the Care Standards Act 2000 (c.14), and
  3. an independent clinic within the meaning given by the Care Standards Act 2000;
- “local authority foster parent” (“rhiant maeth awdurdod lleol”) has the meaning given by the 2014 Act.
Sch. 1 para. 9 in force at 29.4.2019 by S.I. 2019/864, art. 2(3)(a)