General

Commencement
21
1
This Act comes into force in accordance with provision made by the Welsh Ministers by order.
2
An order made under subsection (1) may not provide for any provision of this Act to come into force before the end of the period of two years beginning with the day on which this Act receives Royal Assent.
3
An order made under subsection (1) may not commence the provision made in section 14(3)(b) until section 43(5A) of the Human Tissue Act 2004 has come into force.
4
Subsection (1) does not apply to—
a
section 1,
b
section 2,
c
this section, and
d
section 22;
which are to come into force on the day this Act receives Royal Assent.
5
An order made under subsection (1) may appoint different days for different purposes.