2 Approval of code of practice
The following parts of the British Standards Institution code of practice for noise and vibration control on construction and open sites, numbered BS 5228, are approved for the purpose of giving guidance on appropriate methods for minimising noise from those sites—
(a) Part 1: Noise, numbered BS 5228-1:2009, as amended by Amendment No. 1, which came into effect on 21 February 2014;
(b) Part 2: Vibration, numbered BS 5228-2:2009, as amended by Amendment No. 1, which came into effect on 3 June 2014.