SCHEDULE 4 Sampling and analysis

PART 3 Monitoring for indicative dose and analytical performance characteristics

11 Screening strategies for gross alpha activity and gross beta activity
If the gross alpha activity exceeds 0,1Bq/l or the gross beta activity exceeds 1,0Bq/l, analysis for specific radionuclides is required.