7 Relevant information: finding of no impairment by a fitness to practise panel
1 This regulation applies where a fitness to practise panel has made a relevant decision specified in regulation 3(2)(d).
2 The entry in the register in respect of the registered person must state—
(a) that there has been a finding that the person’s fitness to practise is not impaired, and
(b) that the fitness to practise panel has given advice or a warning (as the case may be) to the person.