1 Title and interpretation
1 The title of this Order is the Human Transplantation (Wales) Act 2013 (Commencement) Order 2015.
2 In this Order, “the Act” (“y Ddeddf”) means the Human Transplantation (Wales) Act 2013.

2 Provisions coming into force on 12 September 2015
The appointed day for the following provisions of the Act coming in to force is 12 September 2015—
(a) sections 7 to 9 for the purpose of making regulations;
(b) section 15, except for paragraph (e) of subsection (4); and
(c) section 20.

3 Provisions coming into force on 1 December 2015
The appointed day for the following provisions of the Act coming in to force is 1 December 2015—
(a) sections 3 to 6;
(b) sections 7 to 9 (in so far as they are not in force);
(c) sections 10 to 13;
(d) section 14, except for paragraph (b) of subsection (3); and
(e) sections 16 to 19.
Mark Drakeford Minister for Health and Social Services, one of the Welsh Ministers 9 September 2015