PART 1 Introduction

5 Meaning of “polluted water”
Water is polluted if—
(a) it is freshwater and contains a concentration of nitrates greater than 50 mg/l, or could do so if these Regulations were not to apply there, or
(b) it is eutrophic or may in the near future become eutrophic if these Regulations were not to apply there.