SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
2 No fuel is to be used other than wood pellets or wood chips but excluding any such pellets or chips which contain halogenated organic compounds or heavy metals as a result of treatment with wood-preservatives or coatings.