SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
2 No fuel is to be used other than untreated dry wood but excluding any such wood which contains halogenated organic compounds or heavy metals as a result of treatment with wood-preservatives or coatings.