SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
2 No fuel is to be used other than chipped wood, wood pellets, or planed wood shavings, but excluding any such wood, pellets or shavings which contain halogenated organic compounds or heavy metals as a result of treatment with wood-preservatives or coatings.