SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
1 The fireplace must be installed, maintained and operated in accordance with the manufacturer’s “Instruction manual UTSK-ABC-22-AME-S-PPU” dated 25 September 2008 where ABC is model number i.e. 180, 240, 300.