SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
1 The fireplaces must be installed, maintained and operated in accordance with the manufacturer’s instructions dated June 2005, reference Bedienungsanleitung Firematic V 1.1 ENG doc.