SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
1 The fireplace must be installed, maintained and operated in accordance with the manufacturer’s instructions dated 4 December 2004, reference D13W together with manufacturer’s instructions dated 4 October 2004, reference GHD/DUN4B/1.