SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
1 The fireplace must be installed, maintained and operated in accordance with the manufacturer’s installation instructions IAV SE/EX 0726-6 611821; Lighting instruction BAV SA/EX 0717-2 611820. A permanent stop must be in place on the air inlet to prevent closure beyond a minimum air open position.