SCHEDULE 6 Minimum number of sampling points

PART 5 Ozone: minimum number of sampling points for fixed measurements for zones attaining the long-term objectives
9 The number of stations located in agglomerations and other zones may be reduced to one-third of the number specified in the Table in Part 4. Where information from fixed measurement stations is the sole source of information, at least one monitoring station should be kept. If, in zones where there is supplementary assessment, the result of this is that a zone has no remaining station, co-ordination with the number of stations in neighbouring zones must ensure adequate assessment of ozone concentrations against long-term objectives.