SCHEDULE 3 Additional conditions that apply to the keeping of laying hens in conventional cages
5 Cages must be at least 40 cm high over at least 65% of the cage area and not less than 35 cm at any point, the area being obtained by multiplying 550 cm2 by the number of birds kept in the cage.