2 Interpretation
In these Regulations—
“the Charges for Drugs and Appliances Regulations” means the National Health Service (Free Prescriptions and Charges for Drugs and Appliances) (Wales) Regulations 2007;
“the Indicative Amounts Regulations” means the National Health Service (Indicative Amounts) Regulations 1997;
“the Prescribed Functions Regulations” means the National Health Service (Payments by Local Authorities to Health Authorities) (Prescribed Functions) (Wales) Regulations 2001;
“the principal Regulations” means the National Health Service (Pharmaceutical Services) Regulations 1992.
S.I.1997/980; relevant amending instrument is S.I.2005/641.
S.I.2001/1543 (W.108).
S.I.1992/662.