6 Amendments to Class J of Part 14 of Schedule 2
1 Class J (installation or alteration etc of solar equipment on non-domestic premises) of Part 14 of Schedule 2 is amended as follows.
2 Omit paragraph J.1(d).
3 Omit paragraph J.3.