PART 1 Preliminary

5 Provisions disapplied
1 The Regulations listed in the first column of the table in Schedule 1 (statutory instruments disapplied) do not apply to a vessel which meets the conditions set out in paragraph (2) to the extent specified in the third column of that table.
2 The conditions are that the vessel—
(a) has been surveyed and issued with a certificate in accordance with these Regulations, and
(b) in the case of a vessel the keel of which was laid or which was at a similar stage of construction on or after 7th August 2014, complies with the standards set out in—
(i) Annex 1 to Marine Guidance Note MGN 601(M) where the vessel is less than 200 tons, or
MGN 601(M) is available at the following address: MGN 601 MLC Crew accommodation for small vessels < 200GT - GOV.UK (www.gov.uk).
(ii) Annex 1 to Marine Guidance Note MGN 602(M) where the vessel is 200 tons or more but less than 500 tons.
MGN 602(M) is available at the following address: MGN 602 MLC Substantial equivalence for accommodation for 200GT to < 500GT vessels - GOV.UK (www.gov.uk).