SCHEDULE 4 Amendment to the Product Safety and Metrology (Amendment) (EU Exit) Regulations 2020
1 (1) The Product Safety and Metrology (Amendment) (EU Exit) Regulations 2020 are amended as follows.
(2) In regulation 2(1)—
(a) for “1 and 3” substitute “ 1, 3 and 5 ”;
(b) after “Recognition” insert “ Agreement ”.
(3) Omit the following provisions from Schedule 1—
(a) paragraph 1(d)(ii);
(b) paragraph 1(e)(iii);
(c) paragraph 1(i)(i);
(d) paragraph 1(j)(i);
(e) paragraph 1(k)(i);
(f) paragraph 1(l)(i);
(g) paragraph 1(m)(i);
(h) paragraph 1(n)(ii);
(i) paragraph 1(o)(i);
(j) paragraph 1(p)(i);
(k) paragraph 1(q)(i);
(l) paragraph 1(r)(i);
(m) paragraph 1(s)(i);
(n) paragraph 1(u)(ii);
(o) paragraph 1(v)(ii).
(4) Omit paragraph 1(a) of Schedule 2.
Sch. 4 para. 1 in force at 31.12.2020 immediately before the coming into force of regulation 10 of the Product Safety, Metrology and Mutual Recognition Agreement (Amendment) (EU Exit) Regulations 2019, see reg. 1(3)