PART 1 Introductory Provisions

2 Extent
1 This Part and Part 2 extend to England and Wales, Scotland and Northern Ireland.
2 Part 3 extends to Northern Ireland only.
3 Any amendment or revocation made by Parts 4, 5 and 6 has the same extent as the provision amended or revoked.
4 Part 7 extends to England and Wales and Scotland only.
Reg. 2 in force at 31.12.2020 immediately before the coming into force of regulation 2(1) of the Product Safety and Metrology (Amendment) (EU Exit) Regulations 2020, see reg. 1(3)