PART 4 Miscellaneous

7 Amendments of the Non-automatic Weighing Instruments Regulations 2016
1 The Non-automatic Weighing Instruments Regulations 2016 are amended as follows.
S.I. 2016/1152.
2 In regulation 30(1) (action to be taken by distributors where regulated non-automatic weighing instruments placed on the market by them are not in conformity with essential requirements), for “placed”, substitute “made available”.
3 In regulation 66(2) (offence of failing to comply with an enforcement notice), for “compliance notice”, substitute “enforcement notice”.
4 In regulation 68(1)(c) (re-qualification), for “regulation 67(2)(a) to (iv) or (2)”, substitute “regulation 67(2) or 67(3)”.