SCHEDULES

SCHEDULE 12 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS

Acquisition of apparatus
5 Regardless of any provision in this Order or anything shown on the deposited plans, Network Rail must not acquire any apparatus otherwise than by agreement.