PART 6 THE HOUSING ADMINISTRATOR

CHAPTER 1 Replacing the Housing Administrator

6.2 Notice of intention to resign
1 The housing administrator must give at least five business days’ notice of intention—
(a) to resign in a case falling within rule 6.1(1); or
(b) to apply for the court’s permission to resign in a case falling within rule 6.1(2).
2 The notice must contain—
(a) identification details for the proceedings; and
(b) the date of appointment of the housing administrator.
3 The notice must also contain—
(a) the date with effect from which the housing administrator intends to resign; or
(b) where permission of the court is required under rule 6.1(2), the date on which the housing administrator intends to file with the court an application for permission to resign.
4 Notice must be delivered to—
(a) the Secretary of State;
(b) the Regulator of Social Housing;
(c) if there is a continuing housing administrator of the registered provider, to that continuing housing administrator; and
(d) if there is no such continuing housing administrator, to—
(i) the registered provider, and
(ii) all the registered provider’s creditors, including any floating charge holders.
5 The notice must be accompanied by a summary of the housing administrator’s receipts and payments.