5 Amendment of regulation 36(3)
1 Regulation 36(3) (timing of gas safety checks and record keeping obligations) is amended as follows.
2 In sub-paragraph (a), after “Regulations or not” insert “; and see regulation 36A”.
3 In sub-paragraph (b), after “whichever is later” insert “(and see regulation 36A)”.
4 In sub-paragraph (c)—
(i) for “for a period of 2 years from the date of that check” substitute “until there have been two further checks of the appliance or flue under this paragraph or, in respect of an appliance or flue that is removed from the premises, for a period of 2 years from the date of the last check of that appliance or flue”;
(ii) in paragraph (v), after “any” insert “safety”.