2017 No. 863
Fire And Rescue Services, England
Police, England
The Fire and Rescue Authority (Police and Crime Commissioner) (Application of Local Policing Provisions, Inspection, Powers to Trade and Consequential Amendments) Order 2017
Made 6th September 2017
Laid before Parliament 8th September 2017
Coming into force 1st October 2017

The Secretary of State in exercise of the powers conferred by sections 95, 96 and 123 of the Local Government Act 2003, sections 4M(2), 28(A7)(e) of the Fire and Rescue Services Act 2004 and section 180(1) and (3) of the Policing and Crime Act 2017 makes the following Order.
2003 c. 26. Relevant amendments to section 95 were made by section 136(3) of, and paragraphs 3(1), 6(a) to (c) of Schedule 7 to, the Local Government and Public Involvement in Health Act 2007 (c. 28) and section 6 of, and paragraphs 83(1) and (4) of Schedule 1 to, the Policing and Crime Act 2017 (c. 3); relevant amendments to section 96 were made by section 136(3) of, and paragraphs 3(1) and 6(a) to (c) of Schedule 7 to, the Local Government and Public Involvement in Health Act 2007.
2004 c. 21. Section 4M was inserted by section 6 of, and paragraphs (1) and (5) of Schedule 1 to, the Policing and Crime Act 2017; section 28(A7) was inserted by section 11(1) and (2) of the Policing and Crime Act 2017.
2017 c. 3.

PART 1 General

1 Citation, commencement and application
1 This Order may be cited as the Fire and Rescue Authority (Police and Crime Commissioner) (Application of Local Policing Provisions, Inspection, Powers to Trade and Consequential Amendments) Order 2017 and comes into force on 1st October 2017.
2 This Order applies to England only.

2 Interpretation
In this Order—
“the FRS Act 2004” means the Fire and Rescue Services Act 2004;
“Authority” means a fire and rescue authority created by an order under section 4A of the FRS Act 2004;
“chief fire officer” means the person with responsibility for managing the fire and rescue service;
“fire and rescue service” means the personnel, services and equipment secured by the Authority for the purposes of carrying out the Authority’s functions under—
(a) section 6 of the FRS Act 2004 (fire safety);
(b) section 7 of that Act (fire-fighting);
(c) section 8 of that Act (road traffic accidents);
(d) any order under section 9 of that Act (emergencies) which applies to the Authority;
(e) section 2 of the Civil Contingencies Act 2004 (duty to assess, plan and advise) and any subordinate legislation under that Act applying to the Authority;
2004 c. 36. There are amendments to section 2 that are not relevant to this Order.
(f) any other provision of or made under an enactment which confers functions on a fire and rescue authority;
“relevant police and crime panel” in relation to an Authority means the police and crime panel for the police area—
(a) which corresponds to the area of the Authority; or
(b) within which the area of the Authority falls.

PART 2 Appointment, Suspension and Dismissal of the Chief Fire Officer

CHAPTER 1 Appointment

3 Appointment of the chief fire officer
An Authority must comply with articles 4 to 14 in appointing a person to be chief fire officer.
The provisions in Chapter 1 of Part 2 correspond to Part 1 of Schedule 8 to the Police Reform and Social Responsibility Act 2011 and Part 3 of S.I. 2012/2271.

4 No appointment until end of confirmation process
1 An Authority must not appoint a person to be chief fire officer unless the end of the confirmation process has been reached.
2 The end of the confirmation process is reached in a case to which article 9 applies—
(a) where the relevant police and crime panel makes a recommendation in relation to the appointment, on the date on which the Authority notifies the panel of its decision whether or not to accept that recommendation under article 9(3); or
(b) where the relevant police and crime panel does not make a report in relation to the appointment, at the end of the period of three weeks starting with the day on which the panel receives the notification from the Authority of the proposed appointment.
3 The end of the confirmation process is reached in a case to which article 10 applies—
(a) where the relevant police and crime panel does not make a report in relation to the appointment, at the end of the period of three weeks starting with the day on which the police and crime panel receives the notification from the Authority of the proposed appointment; or
(b) where the relevant police and crime panel makes a recommendation in relation to the appointment under article 12, the date on which the Authority notifies the panel of its decision whether or not to accept that recommendation under article 13(b).

5 Notification of proposed appointment
1 An Authority must notify the relevant police and crime panel of each proposed appointment of a chief fire officer by the Authority.
2 In such a case, the Authority must also notify the relevant police and crime panel of the following information—
(a) the name of the person whom the Authority is proposing to appoint (“the candidate”);
(b) the criteria used to assess the suitability of the candidate for the appointment;
(c) why the candidate satisfies those criteria; and
(d) the terms and conditions on which the candidate is to be appointed.

6 Panel to review and report on proposed appointment
1 This paragraph applies if a relevant police and crime panel is notified under article 5 of a proposed appointment of a chief fire officer.
2 The panel must review the proposed appointment.
3 The panel must make a report to the Authority on the proposed appointment.
4 Subject to article 7(2) the report must include a recommendation to the Authority as to whether or not the candidate should be appointed.
5 The panel must comply with paragraphs (2) to (4) within the period of three weeks beginning with the day on which the panel receives the notification from the Authority of the proposed appointment.
6 The panel must publish the report made to the Authority under this paragraph.
7 In calculating the period of three weeks for the purpose of paragraph (5), any relevant post-election period is to be ignored.
8 In this article and articles 12 and 22 “relevant post-election period” means the period that—
(a) begins with the day of the poll at an ordinary election of a police and crime commissioner under section 50 of the Police Reform and Social Responsibility Act 2011; and
2011 c. 13.
(b) ends with the day on which the person elected as police and crime commissioner delivers a declaration of acceptance under section 70 of that Act.

7 Power of panel to veto proposed appointment
1 The relevant police and crime panel may, having reviewed the proposed appointment, veto the appointment of the candidate.
2 If the panel vetoes the appointment of the candidate, the report made under article 6 must include a statement that the panel has vetoed it.
3 References in this Part to a police and crime panel vetoing the appointment of a candidate are references to the panel making a decision, by the required majority, that the candidate should not be appointed as chief fire officer.
4 For that purpose, the panel makes that decision by the required majority if at least two-thirds of the persons who are members of the panel at the time when the decision is made vote in favour of making that decision.
5 The power conferred by this paragraph is exercisable in relation to a proposed appointment only during the period of three weeks mentioned in article 6(5).

8 Confirmation hearings
1 A relevant police and crime panel must hold a confirmation hearing—
(a) before making a report under article 6 to the Authority in relation to a proposed appointment; and
(b) before making a recommendation under article 6 (where applicable) or vetoing an appointment under article 7 (where applicable).
2 For the purposes of this article—
(a) “confirmation hearing” is a meeting of the panel, held in public, at which the candidate is requested to appear for the purpose of answering questions relating to the appointment.
(b) references to a person appearing at a meeting of the panel are references to the person—
(i) attending the meeting in person; or
(ii) not attending the meeting in person, but participating in the proceedings at the meeting by any means that enable the person to hear, and be heard in, those proceedings as they happen.

9 Next steps if no veto
1 This article applies if the relevant police and crime panel does not veto the appointment of a candidate.
2 The Authority may accept or reject the panel’s recommendation as to whether or not the candidate should be appointed.
3 The Authority must notify the panel of the decision whether to accept or reject the recommendation.

10 Next steps if veto
1 This article applies if the relevant police and crime panel vetoes the appointment of a candidate.
2 The Authority must not appoint that candidate as the chief fire officer.

11 Veto: proposal of reserve candidate
1 Where the relevant police and crime panel exercises the power under article 7 the Authority shall propose another person for appointment as the chief fire officer (“a reserve candidate”).
2 The Authority proposes a reserve candidate by notifying the panel of the following information—
(a) the name of the reserve candidate;
(b) the criteria used to assess the suitability of the reserve candidate for the appointment;
(c) why the reserve candidate satisfies those criteria; and
(d) the terms and conditions on which the reserve candidate is to be appointed.

12 Panel’s consideration of reserve candidate
1 Within the period of three weeks beginning with the day on which the relevant police and crime panel receives notification under article 11(2) the panel shall—
(a) review the proposed appointment; and
(b) make a report to the Authority on the proposed appointment.
2 Before making a report under paragraph (1)(b), the panel must hold a confirmation hearing within the meaning of article 8(2)(a).
3 The report made under paragraph (1)(b) must include a recommendation to the Authority as to whether or not the reserve candidate should be appointed.
4 The panel must publish the report made under paragraph (1)(b).
5 In calculating the period of three weeks for the purpose of paragraph (1), any relevant post-election period within the meaning of article 6(8) is to be ignored.

13 Authority’s consideration of report
On receiving a report under article 12(1)(b) the Authority shall—
(a) have regard to the report (including the recommendation in the report); and
(b) notify the panel of its decision as to whether it accepts or rejects the recommendation.

14 Appointment of the chief fire officer
1 After the Authority gives the notification mentioned in article 13(b) it may then—
(a) appoint the reserve candidate as the chief fire officer; or
(b) propose another person for such appointment.
2 Where a proposal is made under paragraph (1)(b), articles 11 to 14 apply in relation to that person as if the proposal had been made under article 11(1) (and accordingly the person is treated for these purposes as a reserve candidate).

CHAPTER 2 Suspension

15 Suspension of the chief fire officer
If an Authority suspends the chief fire officer the Authority must notify the relevant police and crime panel of the suspension.
This provision corresponds to paragraph 11 of Schedule 8 to the Police Reform and Social Responsibility Act 2011.

CHAPTER 3 Dismissal

16 Dismissal of the chief fire officer
An Authority must comply with articles 17 to 23 in relation to the dismissal of the chief fire officer.
The provisions in Chapter 3 of Part 2 correspond or make similar provision to paragraphs 12 to 19 of Schedule 8 to the Police Reform and Social Responsibility Act 2011 and regulation 11A of S.I. 2003/527.

17 No dismissal until the end of the scrutiny process
1 An Authority must not dismiss the chief fire officer until the end of the scrutiny process has been reached.
2 The end of the scrutiny process is reached when the first of the following events occurs—
(a) the period of six weeks mentioned in article 22(2) has ended without the relevant police and crime panel having given the Authority any recommendation as to whether or not the Authority should dismiss the chief fire officer;
(b) the Authority notifies the relevant police and crime panel under article 23(2) of the decision whether or not the Authority accepts the panel’s recommendation in relation to the proposed dismissal.

18 Authority’s duty to consult chief fire and rescue inspector for England
If an Authority is proposing to dismiss the chief fire officer the Authority must—
(a) obtain the views of the chief fire and rescue inspector for England in writing; and
See section 28(A2) of the Fire and Rescue Services Act 2004.
(b) have regard to those written views.

19 Notification and explanation of proposal to dismiss
If, having complied with article 18, the Authority proposes to dismiss the chief fire officer the Authority must —
(a) give the chief fire officer—
(i) a written explanation of the reasons why the Authority is proposing dismissal; and
(ii) a copy of the written views of the chief fire and rescue inspector for England obtained by the Authority under article 18;
(b) give the relevant police and crime panel—
(i) written notification that the Authority is proposing to dismiss the chief fire officer;
(ii) a copy of the reasons given to the chief fire officer in accordance with sub-paragraph (a)(i); and
(iii) a copy of the written views of the chief fire and rescue inspector for England obtained by the Authority under article 18.

20 Representations from the chief fire officer
1 The Authority must give the chief fire officer the opportunity to make written representations in response to the Authority’s proposal to dismiss the chief fire officer.
2 The Authority must—
(a) consider any such written representations; and
(b) give the relevant police and crime panel a copy of any such representations as soon as practicable after the Authority is given them.

21 Authority’s response to representations
1 An Authority must comply with this article if, after complying with article 20, the Authority is still proposing to dismiss the chief fire officer.
2 The Authority must notify —
(a) the chief fire officer; and
(b) the relevant police and crime panel
that it is still proposing to dismiss the chief fire officer.
3 The Authority must at the time of giving the chief fire officer and the police and crime panel notification of the Authority’s intention under paragraph (2)—
(a) give the chief fire officer and the panel a written explanation of the reasons why the Authority still proposes to dismiss the chief fire officer;
(b) give the chief fire and rescue inspector for England a copy of the notification and explanation; and
(c) unless the person who is for the time being designated as the head of the Authority’s paid service under section 4 of the Local Government and Housing Act 1989 is also the chief fire officer, give the head of the Authority’s paid service a copy of the notification, the explanation and the written views of the chief fire and rescue inspector for England obtained in accordance with article 18.
1989 c. 42. Relevant amendments to section 4 were made by section 6 of, and paragraphs 60, 62(1) and (3) of Schedule 1 to, the Policing and Crime Act 2017.

22 Role of panel
1 Where the Authority notifies the relevant police and crime panel under article 21 that it is still proposing to dismiss the chief fire officer the panel must make a recommendation to the Authority as to whether or not the Authority should dismiss the chief fire officer.
2 The recommendation must be given to the Authority in writing before the end of the period of six weeks beginning on the day on which the panel receives the notification under article 21.
3 In calculating the period of six weeks for the purposes of paragraph (2), any relevant post-election period is to be ignored.
4 Before making the recommendation the panel—
(a) may consult the chief fire and rescue inspector for England; and
(b) must hold a scrutiny hearing.
5 In this article “scrutiny hearing” means a meeting of the panel held in private which the Authority and the chief fire officer are both entitled to attend for the purpose of making representations relating to the Authority’s proposal to dismiss the chief fire officer.
6 The reference in paragraph (5) to attending a meeting of the panel includes participating in the proceedings at the meeting by any means that enable the person to hear, and to be heard in, those proceedings as they happen.
7 The panel must publish the recommendation made to the Authority under this article.

23 Authority’s response to panel’s recommendation
1 The Authority must—
(a) consider the relevant police and crime panel’s recommendation under article 22; and
(b) having considered that recommendation may accept or reject it.
2 The Authority must notify the panel of the decision whether or not to accept the recommendation.

PART 3 Exercise of functions of Chief Fire Officer

24 Securing good value for money
1 The chief fire officer must secure that good value for money is obtained in exercising the officer’s functions.
2 The duty in paragraph (1) includes securing that the persons under the direction and control of the chief fire officer obtain good value for money in exercising their functions.

25 Regard to the fire and rescue plan
1 The chief fire officer must in exercising the officer’s functions have regard to the fire and rescue plan of the Authority in which the officer is employed.
2 In this article “fire and rescue plan” has the meaning given in Schedule A2 to the FRS Act 2004.

PART 4 Inspection

26 Functions to be excluded from inspection
1 The following are excluded functions for the purposes of section 28(A6) of the FRS Act 2004—
(a) the function of approving the integrated risk management plan;
(b) the function of appointing, suspending or dismissing the chief fire officer;
(c) the function of holding the chief fire officer to account for the exercise of—
(i) the functions which are delegated to the chief fire officer in accordance with an order made under section 4A of the FRS Act 2004; and
(ii) the functions of persons under the direction and control of the chief fire officer;
(d) the function of approving a pay policy statement prepared for the purposes of section 38 of the Localism Act 2011;
2011 c. 20.
(e) the function of approving arrangements to enter into a reinforcement scheme under section 13 of the FRS Act 2004 (reinforcement schemes);
(f) the function of approving arrangements with other employers of firefighters under section 15 of the FRS Act 2004 (arrangements with other employers of firefighters);
(g) the function of approving arrangements under section 16 of the FRS Act 2004 (arrangements for discharge of functions by others);
(h) the function of approving plans, modifications to plans and additions to plans for the purpose of ensuring that—
(i) so far as is reasonably practicable, the Authority is able to continue to perform its fire and rescue functions if an emergency occurs; and
(ii) the Authority is able to perform its functions so far as necessary or desirable for the purpose of preventing an emergency, or reducing, controlling or mitigating the effects of an emergency, or taking other action in connection with it;
(i) the function of approving any arrangements for the co-operation of the Authority in relation to its fire and rescue functions with other general Category 1 responders and general Category 2 responders in respect of—
(i) the performance of the Authority’s duty as a fire and rescue authority under section 2 of the Civil Contingencies Act 2004; and
Category 1 responders general are listed in Part 1, and Category 2 responders general are listed in Part 3 of Schedule 1 to the Civil Contingencies Act 2004. There are amendments to Schedule 1 which are not relevant to this Order.
(ii) any duties under subordinate legislation made in exercise of powers under that Act.
See also section 28(A7)(a) to (d) of the Fire and Rescue Services Act 2004.
2 In this article —
(a) in paragraph (1)(a) “integrated risk management plan” means a plan which is —
(i) prepared and published by the Authority in accordance with the requirements of the Fire and Rescue National Framework; and
The Fire and Rescue National Framework is prepared by the Secretary of State under section 21 of the Fire and Rescue Services Act 2004.
(ii) sets out for the period covered by the document—
(aa) an assessment of all foreseeable fire and rescue related risks that could affect the area of the Authority; and
(bb) proposals, including about the allocation of resources, for the mitigation of those risks;
(b) in paragraph (1)(h) “emergency” has the meaning given in section 1 of the Civil Contingencies Act 2004 for Part 1 of that Act.

PART 5 Power to Trade

27 Power to trade in function-related activities
1 Subject to paragraphs (2) and (3), an Authority is authorised to do for a commercial purpose anything which it is authorised to do for the purpose of carrying on any of its ordinary functions.
2 Before exercising the power conferred by paragraph (1), the Authority shall—
(a) prepare a business case in support of the proposed exercise of that power; and
(b) approve that business case.
3 An Authority shall recover the costs of any accommodation, goods, services, staff or any other thing that it supplies to a company in pursuance of any agreement or arrangement to facilitate the exercise of the power conferred by paragraph (1).
4 In this article, “business case” means a comprehensive statement as to—
(a) the objectives of the business,
(b) the investment and other resources required to achieve those objectives,
(c) any risks the business might face and how significant these risks are, and
(d) the expected financial results of the business, together with any other relevant outcomes that the business is expected to achieve.

PART 6 Application with Modifications of Local Policing Enactments
28 The following local policing enactments apply to an Authority with the modifications set out in Schedule 1—
(a) the Elected Local Policing Bodies (Specified Information) Order 2011;
S.I. 2011/3050 amended by S.I 2012/2479 and S.I. 2013/1816.
(b) the Elected Local Policing Bodies (Complaints and Misconduct) Regulations 2012; and
S.I. 2012/62.
(c) the Police and Crime Panels (Precepts and Chief Constable Appointments) Regulations 2012.
S.I. 2012/2271.

PART 7 Consequential Amendments
29 The enactments set out in Schedule 2 are amended as set out in that Schedule.
Nick Hurd Minister of State Home Office 6th September 2017

SCHEDULE 1 Modification of Local Policing Enactments in their application to an Authority
Article 28

Elected Local Policing Bodies (Specified Information) Order 2011
1 The Elected Local Policing Bodies (Specified Information) Order 2011 is modified as follows.
2 Article 1(2) is to be read as if—
(a) after the definition of “the 2011 Act” there were inserted—

““chief fire officer” means the person with responsibility for managing the fire and rescue service;”

;
(b) for the definition of “election” there were substituted—

““election” means an election held under section 50 of the 2011 Act for the police and crime commissioner for the relevant police area;”

;
(c) after the definition of “election” there were inserted —

““fire and rescue service” means the personnel, services and equipment secured by the Authority for the purposes of carrying out the Authority’s functions under—
(a) section 6 of the Fire and Rescue Services Act 2004 (fire safety);
(b) section 7 of that Act (fire-fighting);
(c) section 8 of that Act (road traffic accidents);
(d) any order under section 9 of that Act (emergencies) which applies to the Authority;
(e) section 2 of the Civil Contingencies Act 2004 and any subordinate legislation under that Act applying to the Authority;
(f) any other provision of or made under an enactment which confers functions on a fire and rescue authority;”

;
(d) for the definition of “relevant office holder” there were substituted—

““relevant office holder” means in the case of a section 4A fire and rescue authority, the person who is for the time being the police and crime commissioner for the relevant police area;”

;
(e) before the definition of “senior employee” there were inserted—

““relevant police area” means the police area—
(a) which corresponds to the area of the section 4A fire and rescue authority, or
(b) within which the area of the section 4A fire and rescue authority falls;
“section 4A fire and rescue authority” means a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004;”

;
(f) in the definition of “senior employee” for “an elected local policing body” there were substituted “a section 4A fire and rescue authority”; and
(g) for the definition of “staff” there were substituted—

““staff” in the case of a section 4A fire and rescue authority does not include any person under the direction or control of the chief fire officer.”

.
3 Article 2 is to be read as if—
(a) in paragraph (1) after “Police Reform and Social Responsibility Act 2011,” there were inserted “as applied by paragraph 4 of Schedule A2 to the Fire and Rescue Service Act 2004,”; and
(b) in paragraph (2) for “the chief constable” in each place it appears there were substituted “the chief fire officer”.
4 The Schedule is to be read as if—
(a) in paragraph 1—
(i) for “the elected local policing body” there were substituted “the section 4A fire and rescue authority”; and
(ii) for “the police and crime panel” there were substituted “the police and crime panel for the relevant police area”;
(b) in paragraph 2 for “the elected local policing body” in each place it appears there were substituted “the section 4A fire and rescue authority”;
(c) in paragraph 2A—
(i) sub–paragraph (a) were omitted; and
(ii) for “the elected local policing body” in both places it appears there were substituted “the section 4A fire and rescue authority”;
(d) for paragraph 3 there were substituted—

“3 In relation to the income and expenditure of the section 4A fire and rescue authority—
(a) the total budget of the authority;
(b) the precept issued by the authority;
(c) information as to each anticipated source of revenue other than that precept;
(d) information as to the proposed expenditure of the authority;
(e) a copy of the annual investment strategy of the authority;
(f) information as to —
(i) each item of expenditure in relation to travel by, accommodation for or subsistence of a relevant office holder, including the recipient of the funds, the purpose of the expenditure and the reasons why the authority considered that good value for money would be obtained; and
(ii) each item of expenditure of the authority in relation to other matters that exceeds £500 including the recipient of the funds, the purpose of the expenditure and the reasons why the authority considered that good value for money would be obtained.”

;
(e) for paragraph 4 there were substituted—

“4 In relation to the property, rights and liabilities of the section 4A fire and rescue authority —
(a) the identity of any premises or land owned by, or occupied for the purposes of, the authority;
(b) a copy of each contract with a value exceeding £10,000 to which the authority is or is to be a party;
(c) a copy of each invitation to tender issued by the authority in relation to a contract which the authority expects will have a value exceeding £10,000;
(d) a list of every contract with a value not exceeding £10,000 to which the authority is or is to be a party, including the value of the contract, the identity of every other party to the contract and the purpose of the contract.”

;
(f) in paragraph 5—
(i) for “elected local policing body” in each place it occurs there were substituted “section 4A fire and rescue authority”;
(ii) in sub-paragraphs (c) and (d) for “body’s” there were substituted “authority’s”; and
(iii) in sub paragraph (d) for “body” there were substituted “authority”;
(g) in paragraph 6—
(i) for “elected local policing body” in each place it appears there were substituted “section 4A fire and rescue authority”; and
(ii) in sub-paragraph (b) for “body’s” there were substituted “authority’s”;
(h) paragraphs 7 and 8 were omitted;
(i) in paragraph 13 for “3(h)” there were substituted “3(f)(i)”;
(j) in paragraph 14 for “3(f) and (g)” there were substituted “3(f)(ii)”;
(k) in paragraph 15 for “elected local policing body” there were substituted “section 4A fire and rescue authority”; and
(l) in paragraph 16—
(i) for “elected local policing body” there were substituted “section 4A fire and rescue authority”; and
(ii) sub-paragraph (c) were omitted.

5 Elected Local Policing Bodies (Complaints and Misconduct) Regulations 2012
The Elected Local Policing Bodies (Complaints and Misconduct) Regulations 2012 have effect as if—
(a) in regulation 2—
(i) the definition of “police and crime panel” were to “the relevant police and crime panel” within the meaning of Schedule A2 to the Fire and Rescue Services Act 2004; and
(ii) the reference to “police and crime commissioner” in the definition of “relevant office holder” were to “a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004”; and
(b) in regulation 28(1)(a) the reference to “police and crime commissioner” were to “a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004”.

6 Police and Crime Panels (Precepts and Chief Constable Appointments) Regulations 2012
The Police and Crime Panels (Precepts and Chief Constable Appointments) Regulations 2012 have effect as if—
(a) in regulation 2 the reference to “police and crime panel” were to “the relevant police and crime panel” within the meaning of Schedule A2 to the Fire and Rescue Services Act 2004; and
(b) in Part 2 (precepts) references to “the police and crime commissioner” were to “a fire and rescue Authority created by an order under section 4A of the Fire and Rescue Services Act 2004”.

SCHEDULE 2 Consequential Amendments
Article 29

1 Amendment of the Local Government Officers (Political Restrictions) Regulations 1990
(1) The Local Government Officers (Political Restrictions) Regulations 1990 are amended as follows.
S.I. 1990/851.
(2) In regulation 3 (terms of appointment and conditions of employment)—
(a) in paragraph (1) for “Subject to paragraph (3)” substitute “Subject to paragraphs (3) and (4)”; and
(b) after paragraph (3) insert—

“4 In relation to a member of staff of a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004 paragraph (1) only applies to a person who holds a post listed in section 2(1)(a) to (e) of the Act.”

.

2 Amendment of the Late Payment of Commercial Debts (Interest) Act 1998 (Commencement No. 1) Order 1998
(1) The Late Payment of Commercial Debts (Interest) Act 1998 (Commencement No. 1) Order 1998 is amended as follows.
S.I. 1998/2479. Paragraph 1 of Schedule 1 was amended by S.I. 2004/3168.
(2) In Schedule 1 (meaning of “United Kingdom public authority”) after paragraph 1(ga) insert—

“(gb) a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004;”

.

3 Amendment of the Redundancy Payments (Continuity of Employment in Local Government, etc) (Modification) Order 1999
(1) The Redundancy Payments (Continuity of Employment in Local Government, etc) (Modification) Order 1999 is amended as follows.
S.I. 1999/2277. Paragraph 1A of section 6 was inserted in relation to England by S.I. 2004/3168; paragraph 1B was inserted by S.I. 2017/469 and paragraph 3 was amended by paragraph 10(1) and (2) of Part 1 of Schedule 2 to the Civil Contingencies Act 2004 (c. 36).
(2) In section 6 (police, fire and civil defence) of Schedule 1 (employment to which this Order applies: employers immediately before the relevant event) after paragraph 1B insert—

“1C A fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004.”

.

4 Amendment of the Local Government (Best Value) Performance Indicators and Performance Standards (England) Order 2005
(1) The Local Government (Best Value) Performance Indicators and Performance Standards (England) Order 2005 is amended as follows.
S.I. 2005/598.
(2) In article 1(2) (citation, commencement and interpretation) at the end of the definition of “fire and rescue authority” insert “other than an authority created by an order under section 4A of that Act.”.

5 Amendment of the Council Tax (Demand Notices) (England) Regulations 2009
(1) The Council Tax (Demand Notices) (England) Regulations 2009 are amended as follows.
S.I. 2009/3193.
(2) In regulation 2(1) (interpretation) in the definition of “fire and rescue authority” after sub-paragraph (a) insert—

“(ab) a fire and rescue authority created by an order under section 4A of the 2004 Act (power to provide for police and crime commissioner to be fire and rescue authority);”

.
(3) In regulation 5(5) (local government restructuring: efficiency authorities and efficiency information) in the definition of “relevant event” after sub-paragraph (b) insert—

“(ba) an order under section 4A of the 2004 Act (power to provide for police and crime commissioner to be fire and rescue authority),”

.

6 Amendment of the Elected Local Policing Bodies (Specified Information) Order 2011
(1) The Elected Local Policing Bodies (Specified Information) Order 2011 is amended as follows.
(2) After paragraph 16 of the Schedule insert—

“17 Where a police and crime commissioner is also a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004 the commissioner must publish the information in sub-paragraphs (a) and (b) in a consolidated form rather than in relation to each relevant office holder separately—
(a) in relation to an elected local policing body the information specified in paragraph 1(a), (b), (c) and (e); and
(b) in relation to a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004 the information specified in paragraph 1(a),(b), (c) and (e) as applied with modifications to such an authority by the Fire and Rescue Authority (Police and Crime Commissioner) (Application of Local Policing Provisions, Inspection, Powers to Trade and Consequential Amendments) Order 2017.”

7 Amendment of the Community Right to Challenge (Fire and Rescue Authorities and Rejection of Expressions of Interest) (England) Regulations 2012
(1) The Community Right to Challenge (Fire and Rescue Authorities and Rejection of Expressions of Interest) (England) Regulations 2012 are amended as follows.
S.I. 2012/1647.
(2) In regulation 3 (relevant authorities)—
(a) omit “or” at the end of paragraph (c); and
(b) after paragraph (d) insert—

“or
(e) a fire and rescue authority created by an order under section 4A of that Act.”

.

8 Amendment of the Council Tax Reduction Schemes (Prescribed Requirements) (England) Regulations 2012
(1) The Council Tax Reduction Schemes (Prescribed Requirements) (England) Regulations 2012 are amended as follows in relation to council tax reduction schemes made by billing authorities for financial years beginning on or after 1st April 2018.
S.I. 2012/2885. Paragraph 3 of Schedule 4 was amended by S.I. 2013/3181.
See section 13A(9) of the Local Government Finance Act 1992 (c. 14) for the definition of “council tax reduction scheme”. Section 13A was amended by section 10 of the Local Government Finance Act 2012 (c. 17).
See section 1(2) of the Local Government Finance Act 1992 for the definition of “billing authority”.
(2) In Schedule 4 (sums disregarded from applicant’s earnings) after paragraph 3(2)(a) insert—

“(ab) as a part-time fire-fighter employed by a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004;”

.

9 Amendment of the Re-use of Public Sector Information Regulations 2015
(1) The Re-use of Public Sector Information Regulations 2015 are amended as follows.
S.I. 2015/1415.
(2) In regulation 3(1) (public sector bodies) after sub-paragraph (l) insert—

“(la) a fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004;”

.

10 Amendment of the Trade Union (Facility Time Publication Requirements) Regulations 2017
(1) The Trade Union (Facility Time Publication Requirements) Regulations 2017 are amended as follows.
S.I. 2017/328.
(2) In Schedule 1 (public authorities) after paragraph 9 insert—

“9A A fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004.”

.

11 Amendment of the Equality Act 2010 (Specific Duties and Public Authorities) Regulations 2017
(1) The Equality Act 2010 (Specific Duties and Public Authorities) Regulations 2017 are amended as follows.
S.I. 2017/353.
(2) In Schedule 2 after the entry beginning “A fire and rescue authority” insert—

“A fire and rescue authority created by an order under section 4A of the Fire and Rescue Services Act 2004.”

.

EXPLANATORY NOTE
(This note is not part of the Order)
This Order makes provision related to the creation of a fire and rescue authority by an order made under section 4A of the Fire and Rescue Services Act 2004 (c. 21) (“the 2004 Act”). Where a fire and rescue authority is created under section 4A of the 2004 Act the person who is for the time being the police and crime commissioner for the police area that corresponds with the area of the authority created is for the time being to be that fire and rescue authority.
Articles 3 to 23 of the Order make provision in relation to the appointment, suspension and dismissal of the chief fire officer that corresponds or is similar to, the provision made by and under the Police Reform and Social Responsibility Act 2011 (c. 13) (see section 38 of, and Schedule 8 to, that Act). See also Part 3 of S.I. 2012/2271 and regulation 11A of S.I. 2003/527, in relation to the appointment, suspension and removal of chief constables.
Article 24 of the Order sets out the obligations on the chief fire officer in relation to securing good value for money. Article 25 obliges the chief fire officer to have regard in exercising their functions to the fire and rescue plan issued by their Authority.
Article 26 of the Order sets out functions of a fire and rescue authority created under section 4A of the 2004 Act that are to be excluded from inspection under the arrangements for inspection made by section 28 of the 2004 Act.
Sections 95 and 96 of the Local Government Act 2003 provide that a fire and rescue authority created under section 4A of the 2004 Act is authorised to trade in any of their ordinary functions subject to certain conditions. Article 27 sets out those conditions, which require the prior preparation and approval of a business case, and the recovery of any costs incurred by the authority in anything it supplies, including accommodation, goods, services or staff, to a company through which the trading power is exercised. Under section 95(4) of the 2003 Act, the power to trade must be exercised through a company.
Article 28 and Schedule 1 apply, with the modifications set out in the Schedule, the following legislation to a fire and rescue authority created under section 4A of the 2004 Act: the Elected Local Policing Bodies (Specified Information) Order 2011(S.I. 2011/3050), the Elected Local Policing Bodies (Complaints and Misconduct) Regulations 2012 (S.I. 2012/62) and the Police and Crime Panels (Precepts and Chief Constable Appointments) Regulations 2012 (S.I. 2012/2271).
Article 29 and Schedule 2 make provision for consequential amendments.
A full impact assessment has not been produced for this instrument as no impact on the private or voluntary sectors is foreseen.