7 Amendment of the Education (Student Support) Regulations 2011
In regulation 13 (Miscellaneous)—
(a) after paragraph (2), insert—

“2A Paragraph (1) does not apply where the current course—
(a) is a pre-registration course in an allied health profession subject, midwifery, nursing, nursing and social work or operating department practice;
(b) leads to an ordinary degree, honours degree, or, in respect of a course in operating department practice, to an ordinary degree, honours degree or a diploma; and
(c) begins on or after 1st August 2017.”

;
(b) after paragraph (7), insert—

“8 Paragraphs (6) and (7) do not apply to a person who is treated as being ordinarily resident in the United Kingdom by virtue of paragraph 1(4) of Schedule 1 on the basis of temporary employment falling within paragraph 1(5)(a) of that Schedule.”

.