SCHEDULES

SCHEDULE 9 PROTECTION OF INTERESTS

PART 10 FOR THE PROTECTION OF SSE SERVICES PLC AND SOUTHERN ELECTRIC POWER DISTRIBUTION PLC

Retained apparatus
108 (1) Not less than 28 days before starting the execution of any works in, on or under any land purchased, held, appropriated or used under this Order that are near to, or will or may affect, any apparatus the removal of which has not been required by the undertaker under paragraph 106(2), the undertaker must submit to the protected person in question a plan of the works to be executed.
(2) Those works must be executed only in accordance with the plan submitted under sub-paragraph (1) and in accordance with such reasonable requirements as may be made in accordance with sub-paragraph (3) by the protected person for the alteration or otherwise for the protection of the apparatus, or for securing access to it, and the protected person is entitled to watch and inspect the execution of those works.
(3) Any requirements made by a protected person under sub-paragraph (2) must be made within a period of 21 days beginning with the date on which a plan under sub-paragraph (1) is submitted to it.
(4) If a protected person in accordance with sub-paragraph (3) and in consequence of the works proposed by the undertaker, reasonably requires the removal of any apparatus and gives written notice to the undertaker of that requirement, paragraphs 100 to 102 and 105 to 107 apply as if the removal of the apparatus had been required by the undertaker under paragraph 106(2).
(5) Nothing in this paragraph precludes the undertaker from submitting at any time or from time to time, but in no case less than 28 days before commencing the execution of any works, a new plan instead of the plan previously submitted, and having done so the provisions of this paragraph apply to and in respect of the new plan.
(6) The undertaker is not required to comply with sub-paragraph (1) in a case of emergency but in that case must give, to the protected person in question, notice as soon as is reasonably practicable and a plan of those works as soon as reasonably practicable subsequently and must comply with sub-paragraph (2) in so far as is reasonably practicable in the circumstances.