SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS

Removal of apparatus
7 (1) If, in the exercise of the powers conferred by this Order, the undertaker acquires any interest in any land in which any apparatus is placed or over which access to any apparatus is enjoyed or requires that the statutory undertaker’s apparatus is relocated or diverted, that apparatus must not be removed under this Part of this Schedule, and any right of a statutory undertaker to maintain that apparatus in that land and to gain access to it must not be extinguished, until alternative apparatus has been constructed and is in operation, and access to it has been provided, to the reasonable satisfaction of the statutory undertaker in question in accordance with sub-paragraphs (2) to (6).
(2) If, for the purpose of executing any works in, on or under any land purchased, held, appropriated or used under this Order, the undertaker requires the removal of any apparatus placed in that land, the undertaker must give to the statutory undertaker in question 56 days’ written notice of that requirement, together with a plan of the work proposed, and of the proposed position of the alternative apparatus to be provided or constructed and in that case (or if in consequence of the exercise of any of the powers conferred by this Order an undertaker reasonably needs to remove any of its apparatus) the undertaker must, subject to sub-paragraph (3), afford to the statutory undertaker the necessary facilities and rights for the construction of alternative apparatus in other land of the undertaker and subsequently for the maintenance of that apparatus.
(3) If alternative apparatus or any part of such apparatus is to be constructed elsewhere than in other land of the undertaker, or the undertaker is unable to afford such facilities and rights as are mentioned in sub-paragraph (2) in the land in which the alternative apparatus or part of such apparatus is to be constructed the statutory undertaker must, on receipt of a written notice to that effect from the undertaker, as soon as reasonably possible use its best endeavours to obtain the necessary facilities and rights in the land in which the alternative apparatus is to be constructed.
(4) Any alternative apparatus to be constructed in land of the undertaker under this Part of this Schedule must be constructed in such manner and in such line or situation as may be agreed between the statutory undertaker in question and the undertaker or in default of agreement settled by arbitration in accordance with article 43 (arbitration).
(5) The statutory undertaker in question must, after the alternative apparatus to be provided or constructed has been agreed or settled by arbitration in accordance with article 43, and after the grant to the statutory undertaker of any such facilities and rights as are referred to in sub-paragraphs (2) or (3), proceed without unnecessary delay to construct and bring into operation the alternative apparatus and subsequently to remove any apparatus required by the undertaker to be removed under the provisions of this Part of this Schedule.
(6) Regardless of anything in sub-paragraph (5), if the undertaker gives notice in writing to the statutory undertaker in question that the undertaker intends to execute any work, or part of any work in connection with the construction or removal of apparatus in any land of the undertaker, that work, instead of being executed by the statutory undertaker, must be executed by the undertaker without unnecessary delay under the superintendence, if given, and to the reasonable satisfaction of the statutory undertaker.