PART 3 Amendment of the PDS Regulations

25 Amendment of paragraph 43A of Schedule 3 to the PDS Regulations
In Schedule 3 to the PDS Regulations (other contractual terms), in paragraph 43A (notification provisions specific to prototype agreements), for “The contractor shall” substitute “Where the contractor has elected to enter into a prototype agreement, except for CDS prototype contractors, the contractor shall”.
Paragraph 43A was inserted by S.I. 2015/1728.