2016 No. 1046
Infrastructure Planning
The Meaford Gas Fired Generating Station (Correction) Order 2016
Made 1st November 2016
Coming into force 22nd November 2016

The Meaford Gas Fired Generating Station Order 2016 (“the Order”), which granted development consent within the meaning of the Planning Act 2008 (“the Act”), contains correctable errors within the meaning of the Act.
S.I. 2016/779.
2008 c.29.
As provided for in Schedule 4 to the Act.
Before the end of the relevant period, as defined in paragraph 1(6)(a) of Schedule 4 to the Act, the Secretary of State received a written request from the applicant for the correction of errors and omissions in the Order under paragraph 1(5)(a) of Schedule 4 to the Act .
As defined in paragraph 4 of Schedule 4 to the Act.
In accordance with paragraph 1(7) of Schedule 4 to the Act, the Secretary of State has informed Stafford Borough Council and Staffordshire County Council that the request has been received.
The Secretary of State, in exercise of the powers conferred by section 119 of, and paragraphs 1(4) and (8) of Schedule 4 to, the Act, makes the following Order:

1 Citation and commencement
This Order may be cited as the Meaford Gas Fired Generating Station (Correction) Order 2016 and comes into force on 22nd November 2016.

2 Corrections
The Meaford Gas Fired Generating Station Order 2016 is corrected as set out in the table in the Schedule to this Order, where—
(a) column 1 sets out where the correction is to be made;
(b) column 2 sets out how the correction is to be made; and
(c) column 3 sets out the text to be substituted, inserted or omitted.
Signed by authority of the Secretary of State for Business, Energy and Industrial Strategy
Giles Scott Head of Energy Infrastructure Planning and Coal Liabilities Department for Business, Energy and Industrial Strategy 1st November 2016
SCHEDULE

Table
Column 1	Column 2	Column 3
Where the correction is made	How the correction is made	Text substituted, inserted or omitted
Preamble	For paragraph 2, substitute	“The application has been examined by a single appointed person, who has made a report to the Secretary of State under section 83(1) of the 2008 Act.”
Preamble	In paragraph 3, for “Panel”, substitute	“single appointed person”
Schedule 1, Work No. 1A	After “Work No. 1A a generating station”, omit	“comprising”
Schedule 1, Work No. 1A	For, “(a) one gas turbine building with up to two gas turbines and associated generating unit;”, substitute	“(a) one gas turbine building with up to two gas turbines and up to two associated generating units;”
Article 2

EXPLANATORY NOTE
(This note is not part of the Order)
This Order corrects errors and omissions identified in the Meaford Gas Fired Generating Station Order 2016, a development consent order made under the Planning Act 2008, following a written request from the applicant under paragraph 1(5)(a) of Schedule 4 to that Act.