2 Designation of controlled drugs
1 The controlled drugs specified in Part 1 of Schedule 1 are designated as drugs to which section 7(4) of the Misuse of Drugs Act 1971 applies.
2 Part 2 of Schedule 1 has effect for the purpose of specifying those controlled drugs which are excepted from Part 1 of that Schedule.